Commitment letter for the use of the software N2QP1

Below,

– the word software refers to the N2QP1 code (nickname QPB), created in February 2003.

– the word author stands for J. Charles Gilbert.

By this letter, I specify my commitment and agreement with the following conditions:

– The software is the property of Inria.

– The software will be used with an academic or research purpose only. In particular, it will not be used for commercial applications or in production codes.

– The software may be reproduced for personal use only. In particular, any copy addressed to a third party, even free of charge, would be fraudulent.

– If modifications are performed on the software, these modifications will be communicated to the author and a commitment is taken to transfer their property to the author.

– The software is a research product and is provided without any expressed or implied warranty. There is no warranty of any kind concerning the fitness of this software for any particular purpose.

The software will be used in the following laboratory:

– The code is under the legal responsibility of: – Title:

– Laboratory: – Address: – E-mail:

– Type of computer:

Date: Signature:

Short description of the physical origin of the problem (in French, Italian, or English; text is preferred to formulas):